Command: clear_screen
  
Syntax: 
  clear_screen()
  
Description: 
  Clear the screen using the current background color (may be set 
  by bk_color()). 
  
Comments: 
  This works in all text and pixel-graphics modes.
  
See Also: 
  bk_color, graphics_mode
  
