Command: sprintuf(data)
  
Syntax:  
  include readf.e
  s = sprintuf(data)
  
Description: 
  Makes a readeble sequence of data in free format .
  
Comments: 
  It uses as seperator a whitespace , 
  characterstrings are surrounded by " .

Examples: see readtest.ex
  
See Also: 
  printuf, sprintsf, printsf
  

